From 76499e55eb813b66284b16423693700e86d86ae8 Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Tue, 30 May 2017 22:11:46 -0400
Subject: added draft figures

---
 essential-ising.tex | 16 +++++++++++++---
 1 file changed, 13 insertions(+), 3 deletions(-)

(limited to 'essential-ising.tex')

diff --git a/essential-ising.tex b/essential-ising.tex
index cbb9866..2d8af31 100644
--- a/essential-ising.tex
+++ b/essential-ising.tex
@@ -163,7 +163,7 @@ ansatz, yielding
 for {\sc 4d}.
 At the level of truncation we are working at, the Kramers--Kronig relation
 does not converge in {\sc 2d}. However, the higher moments can still be
-extract, e.g., the susceptibility, by taking
+extracted, e.g., the susceptibility, by taking
 \[
   \chi\propto\pd[2]Fh
   =\frac2\pi\int_{-\infty}^\infty\frac{\im F(t,h')}{(h'-h)^3}\,\dd h'
@@ -202,12 +202,22 @@ in the insets of those figures. As can be seen, there is very good agreement
 between our proposed functional forms and what is measured.
 
 \begin{figure}
-  \caption{Fit of scaling form \eqref{eq:sus_scaling} to numeric data.}
+  \includegraphics{figs/fig_sus-collapse}
+  \caption{Fit of scaling form \eqref{eq:sus_scaling} to numeric data from a
+  $L=1024$ square-lattice Ising model.
+Different colored points show different values of $t$, which vary from
+$0.01$, $0.02$, \dots, $0.1$. Solid black line shows fitted form, with
+$C=0.0107\pm0.0011$ and $B=0.172\pm0.036$.}
   \label{fig:sus}
 \end{figure}
 
 \begin{figure}
-  \caption{Fit of scaling form \eqref{eq:mag_scaling} to numeric data.}
+  \includegraphics{figs/fig_mag-collapse}
+  \caption{Fit of scaling form \eqref{eq:mag_scaling} to numeric data from a
+$L=1024$ square-lattice Ising model. Different colored points show different
+values of $t$, which vary from $0.01$, $0.02$, \dots, $0.1$. Solid black lines
+shows fitted form, with $\mathcal M(0)=1.21055\pm0.00031$,
+$D=0.09440\pm0.00033$, and $B=0.085249\pm0.00099$.}
   \label{fig:mag}
 \end{figure}
 
-- 
cgit v1.2.3-54-g00ecf

