From 966ab2fe278851ce6913414fe5b9c61596f11355 Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Mon, 25 Oct 2021 17:02:39 +0200
Subject: More table tweaks.

---
 ising_scaling.tex | 37 ++++++++++++++++++++-----------------
 1 file changed, 20 insertions(+), 17 deletions(-)

(limited to 'ising_scaling.tex')

diff --git a/ising_scaling.tex b/ising_scaling.tex
index ca5e076..d867714 100644
--- a/ising_scaling.tex
+++ b/ising_scaling.tex
@@ -615,47 +615,49 @@ to their known values at the critical isotherm, or $\theta=1$.
 
 \begin{table}
   \singlespacing
-  \begin{tabular}{c|lllllll}
-    \multicolumn{1}{c|}{$n$} &
-     \multicolumn{1}{c}{$\theta_\mathrm{YL}$} &
-     \multicolumn{1}{c}{$C_\mathrm{YL}$} &
-     \multicolumn{1}{c}{$G_1$} &
-     \multicolumn{1}{c}{$G_2$} &
-     \multicolumn{1}{c}{$G_3$} &
-     \multicolumn{1}{c}{$G_4$} &
-     \multicolumn{1}{c}{$G_5$} \\
+  \raggedright
+  \begin{tabular}{|c|lllllll}
     \hline
-      2 &
+    \multicolumn{1}{|c|}{$n$} &
+      \multicolumn{1}{c}{$\theta_\mathrm{YL}$} &
+      \multicolumn{1}{c}{$C_\mathrm{YL}$} &
+      \multicolumn{1}{c}{$G_1$} &
+      \multicolumn{1}{c}{$G_2$} &
+      \multicolumn{1}{c}{$G_3$} &
+      \multicolumn{1}{c}{$G_4$} &
+      \multicolumn{1}{c}{$G_5$} \\
+    \hline
+    2 &
       0.198152 &
       2.39338 &
       1.52182 &
       0.455868 \\
-      3 &
+    3 &
       0.199048 &
       2.25700 &
       1.30767 &
       0.396157 \\
-      4 &
+    4 &
       0.198918 &
       2.36150 &
       1.46058 &
       0.307198 &
       \hphantom{$-$}0.0323334 \\
-      5 &
+    5 &
       0.198100 &
       2.43224 &
       1.55298 &
       0.362791 &
       $-0.108393$ &
       0.0228573 \\
-      6 &
+    6 &
       0.197027 &
       2.45864 &
       1.59639 &
       0.484865 &
       $-0.119149$ &
       0.0150607 \\
-      7 &
+    7 &
       0.196809 &
       2.49636 &
       1.65176 &
@@ -665,7 +667,7 @@ to their known values at the critical isotherm, or $\theta=1$.
       $-0.00110698$ \\
       \hline
     \end{tabular}
-    \begin{tabular}{c|llllll}
+    \begin{tabular}{|c|llllll}
       \hline
       $n$ &
         \multicolumn{1}{c}{$\theta_0$} &
@@ -703,7 +705,8 @@ to their known values at the critical isotherm, or $\theta=1$.
         $-0.0308462$ &
         0.00491578 &
         \hphantom{$-$}0.000264989 &
-        $-0.000210698$
+        $-0.000210698$ \\
+      \hline
   \end{tabular}
   \caption{
     Free parameters in the fit of the parametric coordinate transformation and
-- 
cgit v1.2.3-54-g00ecf

