From 99913db8c908f9a2f836155697e8a4b0b8571827 Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Thu, 28 Oct 2021 13:05:02 +0200
Subject: Added uncertainty to difference plot.

---
 ising_scaling.tex | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'ising_scaling.tex')

diff --git a/ising_scaling.tex b/ising_scaling.tex
index fb697d8..fc9e8aa 100644
--- a/ising_scaling.tex
+++ b/ising_scaling.tex
@@ -854,15 +854,15 @@ values at the critical isotherm, or $\theta=1$.
     set ylabel '$|\Delta\mathcal F_0^{(m)}|$'
     set yrange [0.000000005:0.0005]
 
-    set style data linespoints
+    set style data yerrorlines
     set key title '\raisebox{0.5em}{$m$}' bottom left
 
     plot \
-      dat using 1:2 title '0', \
-      dat using 1:3 title '1', \
-      dat using 1:4 title '2', \
-      dat using 1:5 title '3', \
-      dat using 1:6 title '4'
+      dat using 1:2:3 title '0', \
+      dat using 1:4:5 title '1', \
+      dat using 1:6:7 title '2', \
+      dat using 1:8:9 title '3', \
+      dat using 1:10:11 title '4'
   \end{gnuplot}
   \caption{
     The error in the $m$th derivative of the scaling function $\mathcal F_0$
-- 
cgit v1.2.3-70-g09d2

