From 7ed74f02149b6969e8658e5c325159dd226b0735 Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Wed, 12 Jun 2024 22:21:46 +0200
Subject: Added acknowledgements.

---
 marginal.tex | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'marginal.tex')

diff --git a/marginal.tex b/marginal.tex
index 3766757..1ece03b 100644
--- a/marginal.tex
+++ b/marginal.tex
@@ -1163,6 +1163,12 @@ taking the zero-temperature limit, we find
 \end{equation}
 \end{widetext}
 
+\section{Conclusion}
+
+\begin{acknowledgements}
+  JK-D is supported by a \textsc{DynSysMath} Specific Initiative of the INFN.
+\end{acknowledgements}
+
 \appendix
 
 \section{A primer on superspace}
-- 
cgit v1.2.3-70-g09d2

