From f18c2b124885a1ba7ed3ebd263da4679c2efed4e Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Wed, 9 May 2018 18:01:34 -0400
Subject: final changes before submission

---
 fig_correlation_collapse-hL.tex | 1823 +++++++++++++++++----------------------
 1 file changed, 780 insertions(+), 1043 deletions(-)

(limited to 'fig_correlation_collapse-hL.tex')

diff --git a/fig_correlation_collapse-hL.tex b/fig_correlation_collapse-hL.tex
index f70bc37..e42051d 100644
--- a/fig_correlation_collapse-hL.tex
+++ b/fig_correlation_collapse-hL.tex
@@ -8,7 +8,7 @@
   {\GNUPLOTspecial{"
 %!PS-Adobe-2.0 EPSF-2.0
 %%Creator: gnuplot 5.2 patchlevel 2
-%%CreationDate: Mon Apr 30 17:46:22 2018
+%%CreationDate: Wed May  9 17:24:59 2018
 %%DocumentFonts: 
 %%BoundingBox: 0 0 246 151
 %%EndComments
@@ -448,7 +448,7 @@ SDict begin [
   /Creator (gnuplot 5.2 patchlevel 2)
 %  /Producer (gnuplot)
 %  /Keywords ()
-  /CreationDate (Mon Apr 30 17:46:22 2018)
+  /CreationDate (Wed May  9 17:24:59 2018)
   /DOCINFO pdfmark
 end
 } ifelse
@@ -965,1289 +965,1026 @@ LTb
 1.000 UP
 2.000 UL
 LTb
-0 g 0 g 944 2318 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 1100 2362 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0323 g 1186 2366 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0968 g 1343 2382 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0968 g 1429 2383 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.2258 g 1586 2380 M
-0 7 V
--31 -7 R
-62 0 V
--62 7 R
-62 0 V
-0 g 1030 2318 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0323 g 1272 2363 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.2258 g 1672 2380 M
-0 9 V
--31 -9 R
-62 0 V
--62 9 R
-62 0 V
-.0968 g 1515 2385 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.2258 g 1758 2380 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-0 g 1116 2315 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0323 g 1358 2367 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-.4839 g 1914 2362 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-.0968 g 1601 2386 M
-0 7 V
--31 -7 R
-62 0 V
--62 7 R
-62 0 V
-.2258 g 1844 2387 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-.4839 g 2000 2356 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-0 g 1202 2317 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-.0323 g 1444 2365 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0968 g 1687 2382 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.2258 g 1930 2378 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-.4839 g 2086 2356 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-.4839 g 2172 2350 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-0 g 1288 2317 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0323 g 1530 2365 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0968 g 1773 2385 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.2258 g 2016 2376 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-.4839 g 2258 2334 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-1 g 2071 2326 M
-0 8 V
--31 -8 R
-62 0 V
--62 8 R
-62 0 V
-0 g 1374 2317 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 1616 2365 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0968 g 1859 2389 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-1 g 2157 2310 M
-0 7 V
--31 -7 R
-62 0 V
--62 7 R
-62 0 V
-.2258 g 2102 2378 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-1 g 2243 2300 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-0 g 1460 2318 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0323 g 1702 2367 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0968 g 1945 2386 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.2258 g 2188 2367 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.4839 g 2344 2290 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-.4839 g 1828 2358 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-0 g 1546 2319 M
-0 2 V
--31 -2 R
-62 0 V
-stroke 1577 2319 M
--62 2 R
-62 0 V
-.0323 g 1788 2365 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0968 g 2031 2382 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-0 g 1632 2317 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-.0323 g 1874 2362 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-.0968 g 2117 2380 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.2258 g 2274 2350 M
-0 6 V
--31 -6 R
-62 0 V
--62 6 R
-62 0 V
-.2258 g 2360 2302 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
+0 g 0 g 963 2321 M
+0 12 V
+-31 -12 R
 62 0 V
-0 g 1718 2317 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 1960 2363 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
+-62 12 R
 62 0 V
-.0968 g 2203 2370 M
-0 4 V
--31 -4 R
+0 g 1092 2320 M
+0 16 V
+-31 -16 R
 62 0 V
--62 4 R
+-62 16 R
 62 0 V
-0 g 1804 2316 M
-0 2 V
--31 -2 R
+0 g 1221 2310 M
+0 28 V
+-31 -28 R
 62 0 V
--62 2 R
+-62 28 R
 62 0 V
-.0323 g 2046 2365 M
-0 3 V
--31 -3 R
+0 g 1350 2319 M
+0 23 V
+-31 -23 R
 62 0 V
--62 3 R
+-62 23 R
 62 0 V
-.0968 g 2289 2347 M
-0 8 V
--31 -8 R
+0 g 1479 2305 M
+0 15 V
+-31 -15 R
 62 0 V
--62 8 R
+-62 15 R
 62 0 V
-.2258 g 2446 2224 M
+0 g 1608 2309 M
 0 5 V
 -31 -5 R
 62 0 V
 -62 5 R
 62 0 V
-.4839 g 2430 2220 M
-0 4 V
--31 -4 R
+0 g 1737 2323 M
+0 13 V
+-31 -13 R
 62 0 V
--62 4 R
+-62 13 R
 62 0 V
-0 g 1890 2315 M
-0 2 V
--31 -2 R
+0 g 1866 2319 M
+0 11 V
+-31 -11 R
 62 0 V
--62 2 R
+-62 11 R
 62 0 V
-.0323 g 2132 2361 M
-0 6 V
--31 -6 R
+0 g 1995 2308 M
+0 16 V
+-31 -16 R
 62 0 V
--62 6 R
+-62 16 R
 62 0 V
-.0968 g 2375 2293 M
-0 3 V
--31 -3 R
+0 g 2124 2298 M
+0 13 V
+-31 -13 R
 62 0 V
--62 3 R
+-62 13 R
 62 0 V
-.2258 g 2532 2142 M
+0 g 2253 2296 M
 0 8 V
 -31 -8 R
 62 0 V
 -62 8 R
 62 0 V
-.4839 g 2516 2145 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-0 g 1976 2317 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 2218 2353 M
-0 4 V
--31 -4 R
+0 g 2382 2260 M
+0 29 V
+-31 -29 R
 62 0 V
--62 4 R
+-62 29 R
 62 0 V
-.0968 g 2461 2206 M
-0 3 V
--31 -3 R
+0 g 2511 2105 M
+0 17 V
+-31 -17 R
 62 0 V
--62 3 R
+-62 17 R
 62 0 V
-.2258 g 2618 2067 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.4839 g 2602 2075 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-0 g 2062 2313 M
-0 2 V
--31 -2 R
+0 g 2640 1961 M
+0 14 V
+-31 -14 R
 62 0 V
--62 2 R
+-62 14 R
 62 0 V
-.0323 g 2304 2327 M
-0 3 V
--31 -3 R
+0 g 2769 1855 M
+0 16 V
+-31 -16 R
 62 0 V
--62 3 R
+-62 16 R
 62 0 V
-.0968 g 2547 2117 M
-0 2 V
--31 -2 R
+0 g 2898 1746 M
+0 13 V
+-31 -13 R
 62 0 V
--62 2 R
+-62 13 R
 62 0 V
-.2258 g 2704 1997 M
-0 4 V
--31 -4 R
+0 g 3027 1702 M
+0 92 V
+-31 -92 R
 62 0 V
--62 4 R
+-62 92 R
 62 0 V
-.4839 g 2688 2012 M
-0 4 V
--31 -4 R
+0 g 3156 1657 M
+0 26 V
+-31 -26 R
 62 0 V
--62 4 R
+-62 26 R
 62 0 V
-0 g 2148 2312 M
-0 2 V
--31 -2 R
+.0323 g 947 2380 M
+0 18 V
+-31 -18 R
 62 0 V
--62 2 R
+-62 18 R
 62 0 V
-.0323 g 2390 2265 M
-0 3 V
--31 -3 R
+.0323 g 1076 2362 M
+0 10 V
+-31 -10 R
 62 0 V
--62 3 R
+-62 10 R
 62 0 V
-.2258 g 2790 1924 M
-0 2 V
--31 -2 R
+.0323 g 1205 2374 M
+0 19 V
+-31 -19 R
 62 0 V
--62 2 R
+-62 19 R
 62 0 V
-.0968 g 2633 2036 M
-0 3 V
--31 -3 R
+.0323 g 1334 2370 M
+0 9 V
+-31 -9 R
 62 0 V
--62 3 R
+-62 9 R
 62 0 V
-.4839 g 2774 1948 M
+.0323 g 1463 2366 M
 0 15 V
 -31 -15 R
 62 0 V
 -62 15 R
 62 0 V
-0 g 2234 2305 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.2258 g 2876 1854 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 2476 2173 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0968 g 2719 1959 M
-0 5 V
--31 -5 R
-62 0 V
--62 5 R
-62 0 V
-.4839 g 2860 1882 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-0 g 2320 2282 M
-0 4 V
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.0323 g 2562 2077 M
-0 4 V
-stroke 2562 2081 M
--31 -4 R
-62 0 V
--62 4 R
-62 0 V
-.2258 g 2962 1779 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.0968 g 2805 1884 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.4839 g 2946 1814 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-0 g 2406 2216 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0323 g 2648 1990 M
-0 2 V
--31 -2 R
-62 0 V
--62 2 R
-62 0 V
-.2258 g 3048 1704 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0968 g 2891 1808 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-.4839 g 3032 1748 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-0 g 2492 2120 M
-0 3 V
--31 -3 R
-62 0 V
--62 3 R
-62 0 V
-.0323 g 2734 1907 M
-0 3 V
--31 -3 R
+.0323 g 1592 2373 M
+0 15 V
+-31 -15 R
 62 0 V
--62 3 R
+-62 15 R
 62 0 V
-.0968 g 2977 1728 M
-0 4 V
--31 -4 R
+.0323 g 1721 2357 M
+0 15 V
+-31 -15 R
 62 0 V
--62 4 R
+-62 15 R
 62 0 V
-.4839 g 3118 1677 M
-0 6 V
--31 -6 R
+.0323 g 1850 2364 M
+0 13 V
+-31 -13 R
 62 0 V
--62 6 R
+-62 13 R
 62 0 V
-.2258 g 3134 1628 M
-0 2 V
--31 -2 R
+.0323 g 1979 2343 M
+0 12 V
+-31 -12 R
 62 0 V
--62 2 R
+-62 12 R
 62 0 V
-0 g 2578 2020 M
-0 4 V
--31 -4 R
+.0323 g 2108 2358 M
+0 30 V
+-31 -30 R
 62 0 V
--62 4 R
+-62 30 R
 62 0 V
-.0323 g 2820 1828 M
-0 8 V
--31 -8 R
+.0323 g 2237 2353 M
+0 13 V
+-31 -13 R
 62 0 V
--62 8 R
+-62 13 R
 62 0 V
-.0968 g 3063 1651 M
-0 2 V
--31 -2 R
+.0323 g 2366 2279 M
+0 10 V
+-31 -10 R
 62 0 V
--62 2 R
+-62 10 R
 62 0 V
-.2258 g 3220 1553 M
-0 4 V
--31 -4 R
+.0323 g 2495 2137 M
+0 25 V
+-31 -25 R
 62 0 V
--62 4 R
+-62 25 R
 62 0 V
-.4839 g 3204 1609 M
+.0323 g 2624 2016 M
 0 10 V
 -31 -10 R
 62 0 V
 -62 10 R
 62 0 V
-0 g 2664 1934 M
-0 4 V
--31 -4 R
+.0323 g 2753 1890 M
+0 43 V
+-31 -43 R
 62 0 V
--62 4 R
+-62 43 R
+62 0 V
+.0323 g 2882 1775 M
+0 18 V
+-31 -18 R
 62 0 V
-.0323 g 2906 1750 M
+-62 18 R
+62 0 V
+.0323 g 3011 1657 M
 0 3 V
 -31 -3 R
 62 0 V
 -62 3 R
 62 0 V
-.2258 g 3306 1473 M
-0 2 V
--31 -2 R
+.0323 g 3140 1560 M
+0 15 V
+-31 -15 R
 62 0 V
--62 2 R
+-62 15 R
 62 0 V
-.0968 g 3149 1574 M
-0 3 V
--31 -3 R
+.0323 g 3269 1513 M
+0 9 V
+-31 -9 R
 62 0 V
--62 3 R
+-62 9 R
 62 0 V
-.4839 g 3290 1530 M
-0 4 V
--31 -4 R
+.0968 g 1190 2375 M
+0 8 V
+-31 -8 R
 62 0 V
--62 4 R
+-62 8 R
 62 0 V
-0 g 2750 1854 M
-0 1 V
--31 -1 R
+.0968 g 1319 2386 M
+0 32 V
+-31 -32 R
 62 0 V
--62 1 R
+-62 32 R
 62 0 V
-.0323 g 2992 1676 M
-0 2 V
--31 -2 R
+.0968 g 1448 2381 M
+0 14 V
+-31 -14 R
 62 0 V
--62 2 R
+-62 14 R
 62 0 V
-.0968 g 3235 1500 M
-0 2 V
--31 -2 R
+.0968 g 1577 2383 M
+0 25 V
+-31 -25 R
 62 0 V
--62 2 R
+-62 25 R
 62 0 V
-.2258 g 3392 1400 M
-0 5 V
--31 -5 R
+.0968 g 1706 2385 M
+0 15 V
+-31 -15 R
 62 0 V
--62 5 R
+stroke 1737 2385 M
+-62 15 R
 62 0 V
-.4839 g 3376 1453 M
-0 3 V
--31 -3 R
+.0968 g 1835 2384 M
+0 7 V
+-31 -7 R
 62 0 V
--62 3 R
+-62 7 R
 62 0 V
-0 g 2836 1787 M
-0 3 V
--31 -3 R
+.0968 g 1964 2384 M
+0 17 V
+-31 -17 R
 62 0 V
--62 3 R
+-62 17 R
 62 0 V
-.0323 g 3078 1609 M
-0 3 V
--31 -3 R
+.0968 g 2093 2393 M
+0 30 V
+-31 -30 R
 62 0 V
--62 3 R
+-62 30 R
 62 0 V
-.0968 g 3321 1433 M
-0 2 V
--31 -2 R
+.0968 g 2222 2378 M
+0 24 V
+-31 -24 R
 62 0 V
--62 2 R
+-62 24 R
 62 0 V
-.2258 g 3478 1327 M
-0 1 V
--31 -1 R
+.0968 g 2351 2289 M
+0 13 V
+-31 -13 R
 62 0 V
--62 1 R
+-62 13 R
 62 0 V
-.4839 g 3462 1377 M
-0 3 V
--31 -3 R
+.0968 g 2480 2189 M
+0 31 V
+-31 -31 R
 62 0 V
--62 3 R
+-62 31 R
 62 0 V
-0 g 2922 1729 M
-0 3 V
--31 -3 R
+.0968 g 2609 2058 M
+0 23 V
+-31 -23 R
 62 0 V
--62 3 R
+-62 23 R
 62 0 V
-.0323 g 3164 1553 M
+.0968 g 2738 1942 M
 0 3 V
 -31 -3 R
 62 0 V
 -62 3 R
 62 0 V
-.0968 g 3407 1378 M
-0 2 V
--31 -2 R
+.0968 g 2867 1830 M
+0 6 V
+-31 -6 R
 62 0 V
--62 2 R
+-62 6 R
 62 0 V
-.2258 g 3564 1260 M
-0 2 V
--31 -2 R
+.0968 g 2996 1718 M
+0 19 V
+-31 -19 R
 62 0 V
--62 2 R
+-62 19 R
 62 0 V
-.4839 g 3548 1297 M
-0 3 V
--31 -3 R
+.0968 g 3125 1593 M
+0 44 V
+-31 -44 R
 62 0 V
--62 3 R
+-62 44 R
+62 0 V
+.0968 g 3254 1477 M
+0 8 V
+-31 -8 R
 62 0 V
-0 g 3008 1687 M
-0 2 V
--31 -2 R
+-62 8 R
 62 0 V
--62 2 R
+.0968 g 3383 1396 M
+0 7 V
+-31 -7 R
 62 0 V
-.0323 g 3250 1513 M
-0 1 V
--31 -1 R
+-62 7 R
 62 0 V
--62 1 R
+.0968 g 3512 1468 M
+-31 0 R
 62 0 V
-.0968 g 3493 1338 M
-0 3 V
--31 -3 R
+-62 0 R
 62 0 V
--62 3 R
+.2258 g 1433 2381 M
+0 10 V
+-31 -10 R
 62 0 V
-stroke 3524 1341 M
-.2258 g 3650 1203 M
-0 1 V
--31 -1 R
+-62 10 R
+62 0 V
+.2258 g 1562 2366 M
+0 27 V
+-31 -27 R
 62 0 V
--62 1 R
+-62 27 R
 62 0 V
-.4839 g 3634 1225 M
-0 2 V
--31 -2 R
+.2258 g 1691 2379 M
+0 11 V
+-31 -11 R
 62 0 V
--62 2 R
+-62 11 R
 62 0 V
-0 g 3094 1663 M
-0 1 V
--31 -1 R
+.2258 g 1820 2381 M
+0 34 V
+-31 -34 R
 62 0 V
--62 1 R
+-62 34 R
 62 0 V
-.0323 g 3336 1488 M
-0 1 V
--31 -1 R
+.2258 g 1949 2399 M
+0 21 V
+-31 -21 R
 62 0 V
--62 1 R
+-62 21 R
 62 0 V
-.0968 g 3579 1313 M
+.2258 g 2078 2356 M
 0 3 V
 -31 -3 R
 62 0 V
 -62 3 R
 62 0 V
-.2258 g 3736 1162 M
-0 7 V
--31 -7 R
+.2258 g 2207 2370 M
+0 13 V
+-31 -13 R
 62 0 V
--62 7 R
+-62 13 R
 62 0 V
-.4839 g 3720 1151 M
-0 2 V
--31 -2 R
+.2258 g 2336 2318 M
+0 41 V
+-31 -41 R
 62 0 V
--62 2 R
+-62 41 R
 62 0 V
-0 g 3180 1655 M
-0 4 V
--31 -4 R
+.2258 g 2465 2200 M
+0 42 V
+-31 -42 R
 62 0 V
--62 4 R
+-62 42 R
+62 0 V
+.2258 g 2594 2087 M
+0 27 V
+-31 -27 R
 62 0 V
-.2258 g 3822 1138 M
-0 2 V
--31 -2 R
+-62 27 R
 62 0 V
--62 2 R
+.2258 g 2723 1969 M
+0 93 V
+-31 -93 R
 62 0 V
-.0968 g 3665 1305 M
-0 1 V
--31 -1 R
+-62 93 R
 62 0 V
--62 1 R
+.2258 g 2852 1879 M
+0 86 V
+-31 -86 R
 62 0 V
-.4839 g 3806 1086 M
-0 1 V
--31 -1 R
+-62 86 R
 62 0 V
--62 1 R
+.2258 g 2981 1761 M
+0 16 V
+-31 -16 R
+62 0 V
+-62 16 R
 62 0 V
-0 g 3266 1652 M
-0 2 V
--31 -2 R
+.2258 g 3110 1642 M
+0 10 V
+-31 -10 R
 62 0 V
--62 2 R
+-62 10 R
 62 0 V
-.0323 g 3508 1479 M
-0 1 V
--31 -1 R
+.2258 g 3239 1554 M
+0 56 V
+-31 -56 R
 62 0 V
--62 1 R
+-62 56 R
 62 0 V
-.0968 g 3751 1300 M
-0 1 V
--31 -1 R
+.2258 g 3368 1429 M
+0 76 V
+-31 -76 R
 62 0 V
--62 1 R
+-62 76 R
 62 0 V
-.4839 g 3892 1030 M
-0 3 V
--31 -3 R
+.2258 g 3497 1301 M
+0 4 V
+-31 -4 R
 62 0 V
--62 3 R
+-62 4 R
 62 0 V
-0 g 3352 1653 M
+.2258 g 3626 1207 M
 -31 0 R
 62 0 V
 -62 0 R
 62 0 V
-.2258 g 3994 1118 M
-0 1 V
--31 -1 R
-62 0 V
--62 1 R
-62 0 V
-.0323 g 3594 1478 M
+.2258 g 3884 1133 M
 -31 0 R
 62 0 V
 -62 0 R
 62 0 V
-.0968 g 3837 1301 M
-0 2 V
--31 -2 R
+.4839 g 1675 2353 M
+0 44 V
+-31 -44 R
 62 0 V
--62 2 R
+-62 44 R
 62 0 V
-.2258 g 4080 1115 M
-0 7 V
--31 -7 R
+.4839 g 1804 2343 M
+0 50 V
+-31 -50 R
 62 0 V
--62 7 R
+-62 50 R
 62 0 V
-.4839 g 3978 988 M
-0 11 V
--31 -11 R
+.4839 g 1933 2345 M
+0 34 V
+-31 -34 R
 62 0 V
--62 11 R
+-62 34 R
 62 0 V
-.4839 g 4150 947 M
-0 6 V
--31 -6 R
+.4839 g 2062 2328 M
+0 46 V
+-31 -46 R
 62 0 V
--62 6 R
+-62 46 R
 62 0 V
-.4839 g 4236 913 M
-0 2 V
--31 -2 R
+.4839 g 2191 2313 M
+0 36 V
+-31 -36 R
 62 0 V
--62 2 R
+-62 36 R
 62 0 V
-.4839 g 4322 901 M
-0 28 V
--31 -28 R
+.4839 g 2320 2281 M
+0 38 V
+-31 -38 R
 62 0 V
--62 28 R
+-62 38 R
 62 0 V
-1 g 2329 2263 M
-0 10 V
--31 -10 R
+.4839 g 2449 2201 M
+0 25 V
+-31 -25 R
 62 0 V
--62 10 R
+-62 25 R
 62 0 V
-1 g 2501 2136 M
-0 3 V
--31 -3 R
+.4839 g 2578 2082 M
+0 67 V
+-31 -67 R
 62 0 V
--62 3 R
+-62 67 R
+62 0 V
+.4839 g 2707 1985 M
+0 15 V
+-31 -15 R
 62 0 V
-.0323 g 3422 1479 M
-0 2 V
--31 -2 R
+stroke 2738 1985 M
+-62 15 R
 62 0 V
--62 2 R
+.4839 g 2836 1878 M
+0 38 V
+-31 -38 R
 62 0 V
-.2258 g 3908 1130 M
-0 16 V
--31 -16 R
+-62 38 R
 62 0 V
--62 16 R
+.4839 g 2965 1807 M
+0 55 V
+-31 -55 R
 62 0 V
-.4839 g 4064 967 M
-0 4 V
--31 -4 R
+-62 55 R
 62 0 V
--62 4 R
+.4839 g 3094 1688 M
+0 19 V
+-31 -19 R
 62 0 V
-1 g 2415 2200 M
-0 10 V
--31 -10 R
+-62 19 R
 62 0 V
--62 10 R
+.4839 g 3223 1579 M
+0 14 V
+-31 -14 R
 62 0 V
-1 g 1727 2320 M
-0 5 V
--31 -5 R
+-62 14 R
 62 0 V
--62 5 R
+.4839 g 3352 1470 M
+0 25 V
+-31 -25 R
 62 0 V
-1 g 1641 2311 M
-0 23 V
--31 -23 R
+-62 25 R
 62 0 V
--62 23 R
+.4839 g 3481 1355 M
+0 15 V
+-31 -15 R
 62 0 V
-1 g 1899 2327 M
-0 5 V
--31 -5 R
+-62 15 R
 62 0 V
--62 5 R
+.4839 g 3610 1232 M
+0 22 V
+-31 -22 R
 62 0 V
-1 g 1813 2329 M
-0 7 V
--31 -7 R
+-62 22 R
 62 0 V
--62 7 R
+.4839 g 3739 1134 M
+0 131 V
+-31 -131 R
 62 0 V
-1 g 1985 2321 M
-0 10 V
--31 -10 R
+-62 131 R
 62 0 V
--62 10 R
+.4839 g 3868 1056 M
+-31 0 R
 62 0 V
-1 g 2587 2069 M
-0 15 V
--31 -15 R
+-62 0 R
 62 0 V
--62 15 R
+.4839 g 3997 1012 M
+0 85 V
+-31 -85 R
 62 0 V
-1 g 2673 2016 M
-0 1 V
--31 -1 R
+-62 85 R
 62 0 V
--62 1 R
+.4839 g 4126 1114 M
+-31 0 R
 62 0 V
-1 g 2759 1954 M
-0 8 V
--31 -8 R
+-62 0 R
 62 0 V
--62 8 R
+1 g 1918 2312 M
+0 14 V
+-31 -14 R
 62 0 V
-1 g 2845 1890 M
-0 4 V
--31 -4 R
+-62 14 R
 62 0 V
--62 4 R
+1 g 2047 2321 M
+0 25 V
+-31 -25 R
 62 0 V
-1 g 2931 1830 M
-0 4 V
--31 -4 R
+-62 25 R
 62 0 V
--62 4 R
+1 g 2176 2284 M
+0 22 V
+-31 -22 R
 62 0 V
-1 g 3017 1766 M
-0 11 V
--31 -11 R
+-62 22 R
 62 0 V
--62 11 R
+1 g 2305 2277 M
+0 39 V
+-31 -39 R
 62 0 V
-1 g 3103 1706 M
-0 1 V
--31 -1 R
+-62 39 R
 62 0 V
--62 1 R
+1 g 2434 2169 M
+0 48 V
+-31 -48 R
 62 0 V
-stroke 3134 1707 M
-1 g 3275 1570 M
-0 19 V
--31 -19 R
+-62 48 R
 62 0 V
--62 19 R
+1 g 2563 2062 M
+0 43 V
+-31 -43 R
 62 0 V
-1 g 3361 1498 M
-0 6 V
--31 -6 R
+-62 43 R
 62 0 V
--62 6 R
+1 g 2692 1976 M
+0 74 V
+-31 -74 R
 62 0 V
-1 g 3189 1635 M
-0 8 V
--31 -8 R
+-62 74 R
 62 0 V
--62 8 R
+1 g 2821 1869 M
+0 31 V
+-31 -31 R
 62 0 V
-1 g 3447 1423 M
-0 3 V
--31 -3 R
+-62 31 R
 62 0 V
--62 3 R
+1 g 2950 1830 M
+0 155 V
+-31 -155 R
 62 0 V
-1 g 3533 1356 M
-0 19 V
--31 -19 R
+-62 155 R
 62 0 V
--62 19 R
+1 g 3079 1673 M
+0 8 V
+-31 -8 R
 62 0 V
-1 g 3619 1274 M
-0 9 V
--31 -9 R
+-62 8 R
 62 0 V
--62 9 R
+1 g 3208 1587 M
+0 104 V
+-31 -104 R
 62 0 V
-1 g 3705 1203 M
-0 1 V
--31 -1 R
+-62 104 R
 62 0 V
--62 1 R
+1 g 3337 1496 M
+0 57 V
+-31 -57 R
 62 0 V
-1 g 3791 1122 M
-0 1 V
--31 -1 R
+-62 57 R
 62 0 V
--62 1 R
+1 g 3466 1410 M
+0 19 V
+-31 -19 R
 62 0 V
-1 g 3963 976 M
-0 14 V
--31 -14 R
+-62 19 R
 62 0 V
--62 14 R
+1 g 3595 1276 M
+-31 0 R
 62 0 V
-1 g 4049 910 M
-0 3 V
--31 -3 R
+-62 0 R
 62 0 V
--62 3 R
+1 g 3724 1177 M
+0 18 V
+-31 -18 R
 62 0 V
-1 g 4135 855 M
-0 1 V
--31 -1 R
+-62 18 R
 62 0 V
--62 1 R
+1 g 3853 1066 M
+0 149 V
+-31 -149 R
 62 0 V
-1 g 4307 790 M
-0 4 V
--31 -4 R
+-62 149 R
 62 0 V
--62 4 R
+1 g 3982 948 M
+-31 0 R
 62 0 V
-1 g 4221 814 M
-0 4 V
--31 -4 R
+-62 0 R
 62 0 V
--62 4 R
+1 g 4111 866 M
+-31 0 R
 62 0 V
-1 g 4393 767 M
-0 3 V
--31 -3 R
+-62 0 R
 62 0 V
--62 3 R
+1 g 4240 962 M
+-31 0 R
+62 0 V
+-62 0 R
 62 0 V
-0 g 944 2320 Pnt
-.0323 g 1100 2363 Pnt
-.0323 g 1186 2367 Pnt
-.0968 g 1343 2383 Pnt
-.0968 g 1429 2385 Pnt
-.2258 g 1586 2384 Pnt
-0 g 1030 2319 Pnt
-.0323 g 1272 2364 Pnt
-.2258 g 1672 2384 Pnt
-.0968 g 1515 2387 Pnt
-.2258 g 1758 2382 Pnt
-0 g 1116 2316 Pnt
-.0323 g 1358 2370 Pnt
-.4839 g 1914 2364 Pnt
-.0968 g 1601 2389 Pnt
-.2258 g 1844 2389 Pnt
-.4839 g 2000 2358 Pnt
-0 g 1202 2320 Pnt
-.0323 g 1444 2367 Pnt
-.0968 g 1687 2383 Pnt
-.2258 g 1930 2381 Pnt
-.4839 g 2086 2359 Pnt
-.4839 g 2172 2352 Pnt
-0 g 1288 2318 Pnt
-.0323 g 1530 2366 Pnt
-.0968 g 1773 2386 Pnt
-.2258 g 2016 2379 Pnt
-.4839 g 2258 2337 Pnt
-1 g 2071 2330 Pnt
-0 g 1374 2319 Pnt
-.0323 g 1616 2367 Pnt
-.0968 g 1859 2391 Pnt
-1 g 2157 2314 Pnt
-.2258 g 2102 2378 Pnt
-1 g 2243 2302 Pnt
-0 g 1460 2319 Pnt
-.0323 g 1702 2369 Pnt
-.0968 g 1945 2388 Pnt
-.2258 g 2188 2369 Pnt
-.4839 g 2344 2291 Pnt
-.4839 g 1828 2360 Pnt
-0 g 1546 2320 Pnt
-.0323 g 1788 2366 Pnt
-.0968 g 2031 2384 Pnt
-0 g 1632 2318 Pnt
-.0323 g 1874 2365 Pnt
-.0968 g 2117 2381 Pnt
-.2258 g 2274 2353 Pnt
-.2258 g 2360 2303 Pnt
-0 g 1718 2319 Pnt
-.0323 g 1960 2364 Pnt
-.0968 g 2203 2372 Pnt
-0 g 1804 2317 Pnt
-.0323 g 2046 2367 Pnt
-.0968 g 2289 2351 Pnt
-.2258 g 2446 2226 Pnt
-.4839 g 2430 2222 Pnt
-0 g 1890 2316 Pnt
-.0323 g 2132 2364 Pnt
-.0968 g 2375 2295 Pnt
-.2258 g 2532 2146 Pnt
-.4839 g 2516 2146 Pnt
-0 g 1976 2319 Pnt
-.0323 g 2218 2355 Pnt
-.0968 g 2461 2208 Pnt
-.2258 g 2618 2069 Pnt
-.4839 g 2602 2076 Pnt
-0 g 2062 2314 Pnt
-.0323 g 2304 2328 Pnt
-.0968 g 2547 2118 Pnt
-.2258 g 2704 1999 Pnt
-.4839 g 2688 2014 Pnt
-0 g 2148 2313 Pnt
-.0323 g 2390 2266 Pnt
-.2258 g 2790 1925 Pnt
-.0968 g 2633 2038 Pnt
-.4839 g 2774 1955 Pnt
-0 g 2234 2307 Pnt
-.2258 g 2876 1856 Pnt
-.0323 g 2476 2175 Pnt
-.0968 g 2719 1961 Pnt
-.4839 g 2860 1884 Pnt
-0 g 2320 2284 Pnt
-.0323 g 2562 2079 Pnt
-.2258 g 2962 1780 Pnt
-.0968 g 2805 1885 Pnt
-.4839 g 2946 1815 Pnt
-0 g 2406 2217 Pnt
-.0323 g 2648 1991 Pnt
-.2258 g 3048 1706 Pnt
-.0968 g 2891 1808 Pnt
-.4839 g 3032 1749 Pnt
-0 g 2492 2121 Pnt
-.0323 g 2734 1909 Pnt
-.0968 g 2977 1730 Pnt
-.4839 g 3118 1680 Pnt
-.2258 g 3134 1629 Pnt
-0 g 2578 2022 Pnt
-.0323 g 2820 1832 Pnt
-.0968 g 3063 1652 Pnt
-.2258 g 3220 1555 Pnt
-.4839 g 3204 1614 Pnt
-0 g 2664 1936 Pnt
-.0323 g 2906 1751 Pnt
-.2258 g 3306 1474 Pnt
-.0968 g 3149 1576 Pnt
-.4839 g 3290 1532 Pnt
-0 g 2750 1855 Pnt
-.0323 g 2992 1677 Pnt
-.0968 g 3235 1501 Pnt
-.2258 g 3392 1403 Pnt
-.4839 g 3376 1454 Pnt
-0 g 2836 1789 Pnt
-.0323 g 3078 1610 Pnt
-.0968 g 3321 1434 Pnt
-.2258 g 3478 1328 Pnt
-.4839 g 3462 1379 Pnt
-0 g 2922 1730 Pnt
-.0323 g 3164 1554 Pnt
-.0968 g 3407 1379 Pnt
-.2258 g 3564 1261 Pnt
-.4839 g 3548 1299 Pnt
-0 g 3008 1688 Pnt
-.0323 g 3250 1513 Pnt
-.0968 g 3493 1339 Pnt
-.2258 g 3650 1204 Pnt
-.4839 g 3634 1226 Pnt
-0 g 3094 1663 Pnt
-.0323 g 3336 1488 Pnt
-.0968 g 3579 1315 Pnt
-.2258 g 3736 1166 Pnt
-.4839 g 3720 1152 Pnt
-0 g 3180 1657 Pnt
-.2258 g 3822 1139 Pnt
-.0968 g 3665 1306 Pnt
-.4839 g 3806 1087 Pnt
-0 g 3266 1653 Pnt
-.0323 g 3508 1479 Pnt
-.0968 g 3751 1301 Pnt
-.4839 g 3892 1031 Pnt
-0 g 3352 1653 Pnt
-.2258 g 3994 1118 Pnt
-.0323 g 3594 1478 Pnt
-.0968 g 3837 1302 Pnt
-.2258 g 4080 1118 Pnt
-.4839 g 3978 994 Pnt
-.4839 g 4150 950 Pnt
-.4839 g 4236 914 Pnt
-.4839 g 4322 915 Pnt
-1 g 2329 2268 Pnt
-1 g 2501 2138 Pnt
-.0323 g 3422 1480 Pnt
-.2258 g 3908 1138 Pnt
-.4839 g 4064 969 Pnt
-1 g 2415 2205 Pnt
-1 g 1727 2323 Pnt
-1 g 1641 2323 Pnt
-1 g 1899 2329 Pnt
-1 g 1813 2332 Pnt
-1 g 1985 2326 Pnt
-1 g 2587 2076 Pnt
-1 g 2673 2016 Pnt
-1 g 2759 1958 Pnt
-1 g 2845 1892 Pnt
-1 g 2931 1832 Pnt
-1 g 3017 1772 Pnt
-1 g 3103 1707 Pnt
-1 g 3275 1579 Pnt
-1 g 3361 1501 Pnt
-1 g 3189 1639 Pnt
-1 g 3447 1425 Pnt
-1 g 3533 1366 Pnt
-1 g 3619 1279 Pnt
-1 g 3705 1204 Pnt
-1 g 3791 1123 Pnt
-1 g 3963 983 Pnt
-1 g 4049 911 Pnt
-1 g 4135 855 Pnt
-1 g 4307 792 Pnt
-1 g 4221 816 Pnt
-1 g 4393 769 Pnt
+0 g 963 2327 Pnt
+0 g 1092 2328 Pnt
+0 g 1221 2324 Pnt
+0 g 1350 2331 Pnt
+0 g 1479 2313 Pnt
+0 g 1608 2312 Pnt
+0 g 1737 2329 Pnt
+0 g 1866 2324 Pnt
+0 g 1995 2316 Pnt
+0 g 2124 2305 Pnt
+0 g 2253 2300 Pnt
+0 g 2382 2275 Pnt
+0 g 2511 2114 Pnt
+0 g 2640 1968 Pnt
+0 g 2769 1863 Pnt
+0 g 2898 1753 Pnt
+0 g 3027 1749 Pnt
+0 g 3156 1670 Pnt
+.0323 g 947 2389 Pnt
+.0323 g 1076 2367 Pnt
+.0323 g 1205 2384 Pnt
+.0323 g 1334 2374 Pnt
+.0323 g 1463 2374 Pnt
+.0323 g 1592 2381 Pnt
+.0323 g 1721 2365 Pnt
+.0323 g 1850 2370 Pnt
+.0323 g 1979 2349 Pnt
+.0323 g 2108 2373 Pnt
+.0323 g 2237 2360 Pnt
+.0323 g 2366 2284 Pnt
+.0323 g 2495 2150 Pnt
+.0323 g 2624 2021 Pnt
+.0323 g 2753 1912 Pnt
+.0323 g 2882 1784 Pnt
+.0323 g 3011 1658 Pnt
+.0323 g 3140 1567 Pnt
+.0323 g 3269 1517 Pnt
+.0968 g 1190 2379 Pnt
+.0968 g 1319 2403 Pnt
+.0968 g 1448 2388 Pnt
+.0968 g 1577 2396 Pnt
+.0968 g 1706 2393 Pnt
+.0968 g 1835 2387 Pnt
+.0968 g 1964 2392 Pnt
+.0968 g 2093 2408 Pnt
+.0968 g 2222 2390 Pnt
+.0968 g 2351 2296 Pnt
+.0968 g 2480 2204 Pnt
+.0968 g 2609 2070 Pnt
+.0968 g 2738 1943 Pnt
+.0968 g 2867 1833 Pnt
+.0968 g 2996 1728 Pnt
+.0968 g 3125 1615 Pnt
+.0968 g 3254 1481 Pnt
+.0968 g 3383 1400 Pnt
+.0968 g 3512 1468 Pnt
+.2258 g 1433 2386 Pnt
+.2258 g 1562 2380 Pnt
+.2258 g 1691 2385 Pnt
+.2258 g 1820 2398 Pnt
+.2258 g 1949 2410 Pnt
+.2258 g 2078 2358 Pnt
+.2258 g 2207 2377 Pnt
+.2258 g 2336 2339 Pnt
+.2258 g 2465 2221 Pnt
+.2258 g 2594 2100 Pnt
+.2258 g 2723 2017 Pnt
+.2258 g 2852 1923 Pnt
+.2258 g 2981 1769 Pnt
+.2258 g 3110 1647 Pnt
+.2258 g 3239 1582 Pnt
+.2258 g 3368 1468 Pnt
+.2258 g 3497 1303 Pnt
+.2258 g 3626 1207 Pnt
+.2258 g 3884 1133 Pnt
+.4839 g 1675 2375 Pnt
+.4839 g 1804 2368 Pnt
+.4839 g 1933 2362 Pnt
+.4839 g 2062 2351 Pnt
+.4839 g 2191 2331 Pnt
+.4839 g 2320 2300 Pnt
+.4839 g 2449 2214 Pnt
+.4839 g 2578 2116 Pnt
+.4839 g 2707 1993 Pnt
+.4839 g 2836 1897 Pnt
+.4839 g 2965 1835 Pnt
+.4839 g 3094 1698 Pnt
+.4839 g 3223 1586 Pnt
+.4839 g 3352 1482 Pnt
+.4839 g 3481 1362 Pnt
+.4839 g 3610 1243 Pnt
+.4839 g 3739 1202 Pnt
+.4839 g 3868 1056 Pnt
+.4839 g 3997 1055 Pnt
+.4839 g 4126 1114 Pnt
+1 g 1918 2319 Pnt
+1 g 2047 2333 Pnt
+1 g 2176 2295 Pnt
+1 g 2305 2297 Pnt
+1 g 2434 2193 Pnt
+1 g 2563 2084 Pnt
+1 g 2692 2014 Pnt
+1 g 2821 1885 Pnt
+1 g 2950 1911 Pnt
+1 g 3079 1677 Pnt
+1 g 3208 1641 Pnt
+1 g 3337 1525 Pnt
+1 g 3466 1420 Pnt
+1 g 3595 1276 Pnt
+1 g 3724 1186 Pnt
+1 g 3853 1144 Pnt
+1 g 3982 948 Pnt
+1 g 4111 866 Pnt
+1 g 4240 962 Pnt
 1.000 UL
 LTb
+0 g 0 g 0 g 0 g 860 2326 M
+103 1 V
+0 g 963 2327 M
+129 1 V
+0 g 1092 2328 M
+129 -4 V
+0 g 1221 2324 M
+129 7 V
+0 g 1350 2331 M
+129 -18 V
+0 g 1479 2313 M
+129 -1 V
+0 g 1608 2312 M
+129 17 V
+0 g 1737 2329 M
+129 -5 V
+0 g 1866 2324 M
+129 -8 V
+0 g 1995 2316 M
+129 -11 V
+0 g 2124 2305 M
+129 -5 V
+0 g 2253 2300 M
+129 -25 V
+0 g 2382 2275 M
+129 -161 V
+0 g 2511 2114 M
+129 -146 V
+0 g 2640 1968 M
+129 -105 V
+0 g 2769 1863 M
+129 -110 V
+0 g 2898 1753 M
+129 -4 V
+0 g 3027 1749 M
+129 -79 V
+0 g .0323 g 947 2389 M
+.0323 g 947 2389 M
+129 -22 V
+.0323 g 1076 2367 M
+129 17 V
+.0323 g 1205 2384 M
+129 -10 V
+.0323 g 1334 2374 M
+129 0 V
+.0323 g 1463 2374 M
+129 7 V
+.0323 g 1592 2381 M
+129 -16 V
+.0323 g 1721 2365 M
+129 5 V
+.0323 g 1850 2370 M
+129 -21 V
+.0323 g 1979 2349 M
+129 24 V
+.0323 g 2108 2373 M
+129 -13 V
+.0323 g 2237 2360 M
+129 -76 V
+.0323 g 2366 2284 M
+129 -134 V
+.0323 g 2495 2150 M
+129 -129 V
+.0323 g 2624 2021 M
+129 -109 V
+.0323 g 2753 1912 M
+129 -128 V
+.0323 g 2882 1784 M
+129 -126 V
+.0323 g 3011 1658 M
+129 -91 V
+.0323 g 3140 1567 M
+129 -50 V
+0 g .0968 g 1190 2379 M
+.0968 g 1190 2379 M
+129 24 V
+.0968 g 1319 2403 M
+129 -15 V
+.0968 g 1448 2388 M
+129 8 V
+.0968 g 1577 2396 M
+129 -3 V
+.0968 g 1706 2393 M
+129 -6 V
+.0968 g 1835 2387 M
+129 5 V
+.0968 g 1964 2392 M
+129 16 V
+.0968 g 2093 2408 M
+129 -18 V
+.0968 g 2222 2390 M
+129 -94 V
+.0968 g 2351 2296 M
+129 -92 V
+.0968 g 2480 2204 M
+129 -134 V
+.0968 g 2609 2070 M
+129 -127 V
+.0968 g 2738 1943 M
+129 -110 V
+.0968 g 2867 1833 M
+129 -105 V
+.0968 g 2996 1728 M
+129 -113 V
+.0968 g 3125 1615 M
+129 -134 V
+.0968 g 3254 1481 M
+129 -81 V
+.0968 g 3383 1400 M
+129 68 V
+0 g .2258 g 1433 2386 M
+.2258 g 1433 2386 M
+129 -6 V
+.2258 g 1562 2380 M
+129 5 V
+.2258 g 1691 2385 M
+129 13 V
+.2258 g 1820 2398 M
+129 12 V
+.2258 g 1949 2410 M
+129 -52 V
+.2258 g 2078 2358 M
+129 19 V
+.2258 g 2207 2377 M
+129 -38 V
+.2258 g 2336 2339 M
+129 -118 V
+.2258 g 2465 2221 M
+129 -121 V
+.2258 g 2594 2100 M
+129 -83 V
+.2258 g 2723 2017 M
+129 -94 V
+.2258 g 2852 1923 M
+129 -154 V
+.2258 g 2981 1769 M
+129 -122 V
+.2258 g 3110 1647 M
+129 -65 V
+.2258 g 3239 1582 M
+129 -114 V
+.2258 g 3368 1468 M
+129 -165 V
+.2258 g 3497 1303 M
+129 -96 V
+.2258 g 3626 1207 M
+258 -74 V
+0 g .4839 g 1675 2375 M
+.4839 g 1675 2375 M
+129 -7 V
+.4839 g 1804 2368 M
+129 -6 V
+.4839 g 1933 2362 M
+129 -11 V
+.4839 g 2062 2351 M
+129 -20 V
+.4839 g 2191 2331 M
+129 -31 V
+.4839 g 2320 2300 M
+129 -86 V
+.4839 g 2449 2214 M
+129 -98 V
+.4839 g 2578 2116 M
+129 -123 V
+.4839 g 2707 1993 M
+129 -96 V
+.4839 g 2836 1897 M
+129 -62 V
+.4839 g 2965 1835 M
+129 -137 V
+.4839 g 3094 1698 M
+129 -112 V
+.4839 g 3223 1586 M
+129 -104 V
+.4839 g 3352 1482 M
+129 -120 V
+.4839 g 3481 1362 M
+129 -119 V
+.4839 g 3610 1243 M
+129 -41 V
+.4839 g 3739 1202 M
+129 -146 V
+.4839 g 3868 1056 M
+129 -1 V
+.4839 g 3997 1055 M
+129 59 V
+0 g 1 g 1918 2319 M
+1 g 1918 2319 M
+129 14 V
+1 g 2047 2333 M
+129 -38 V
+1 g 2176 2295 M
+129 2 V
+1 g 2305 2297 M
+129 -104 V
+1 g 2434 2193 M
+129 -109 V
+1 g 2563 2084 M
+129 -70 V
+1 g 2692 2014 M
+129 -129 V
+1 g 2821 1885 M
+129 26 V
+1 g 2950 1911 M
+129 -234 V
+1 g 3079 1677 M
+129 -36 V
+1 g 3208 1641 M
+129 -116 V
+1 g 3337 1525 M
+129 -105 V
+1 g 3466 1420 M
+129 -144 V
+1 g 3595 1276 M
+129 -90 V
+1 g 3724 1186 M
+129 -42 V
+1 g 3853 1144 M
+3982 948 L
+1 g 3982 948 M
+129 -82 V
+1 g 4111 866 M
+129 96 V
+stroke
+LTb
 LCb setrgbcolor
-1820 2837 M
-11 -9 V
-38 -27 V
-37 -27 V
-38 -27 V
-37 -26 V
-37 -27 V
-38 -27 V
-37 -27 V
-37 -27 V
-38 -27 V
+2168 2837 M
 37 -26 V
 37 -27 V
 38 -27 V
@@ -2295,23 +2032,23 @@ LCb setrgbcolor
 37 -27 V
 37 -27 V
 38 -27 V
-37 -26 V
-38 -27 V
 37 -27 V
+38 -26 V
 37 -27 V
-38 -27 V
 37 -27 V
-37 -26 V
 38 -27 V
 37 -27 V
 37 -27 V
-38 -27 V
-37 -27 V
 38 -26 V
 37 -27 V
 37 -27 V
 38 -27 V
 37 -27 V
+38 -27 V
+37 -26 V
+37 -27 V
+38 -27 V
+37 -27 V
 stroke
 2.000 UL
 LTb
-- 
cgit v1.2.3-54-g00ecf

