From 291938ceaf4d89b92bded5af193d7b7072fb57ec Mon Sep 17 00:00:00 2001
From: Jaron Kent-Dobias <jaron@kent-dobias.com>
Date: Wed, 28 Nov 2018 08:33:27 -0500
Subject: changed figures to screenshot pngs for publication, added first two
 proof responses

---
 monte-carlo.tex | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'monte-carlo.tex')

diff --git a/monte-carlo.tex b/monte-carlo.tex
index d535c3b..8322d6c 100644
--- a/monte-carlo.tex
+++ b/monte-carlo.tex
@@ -4,7 +4,7 @@
 
 \documentclass[aps,pre,reprint]{revtex4-1}
 
-\usepackage{amsmath,amssymb,latexsym,mathtools,algorithm}
+\usepackage{amsmath,amssymb,latexsym,mathtools,algorithm,graphicx}
 
 
 % uncomment to label only equations that are referenced in the text
@@ -519,7 +519,7 @@ times and these numeric experiments can be found in section
 \ref{sec:performance}.
 
 \begin{figure}
-  \include{fig_generator-times}
+  \includegraphics[width=\linewidth]{fig_generator-times.png}
   \caption{
     The scaled autocorrelation time of the energy $\H$ for the Wolff algorithm
     on a $32\times32\times32$ \textsc{xy} model at its critical temperature as a
@@ -610,7 +610,7 @@ roughly like $h^{-z\nu/\beta\delta}$ and collapse appropriately as a function
 of $hL^{\beta\delta/\nu}$.
 
 \begin{figure*}
-  \include{fig_correlation-times}
+  \includegraphics[width=\textwidth]{fig_correlation-times.png}
   \caption{
     Scaling collapse of autocorrelation times $\tau$ for the energy $\H$
     scaled by the average cluster size as a function of external field for
@@ -680,7 +680,7 @@ proportional to their size, or
 \]
 
 \begin{figure*}
-  \input{fig_cluster-scaling}
+  \includegraphics[width=\linewidth]{fig_cluster-scaling.png}
   \caption{Collapses of rescaled average Wolff cluster size $\avg s_{\text{\sc
     1c}}L^{-\gamma/\nu}$ as a function of field scaling variable
     $hL^{\beta\delta/\nu}$ for a variety of models. Critical exponents
@@ -740,7 +740,7 @@ two-dimensional melting of argon on a graphite substrate
 \cite{zhang_melting_1991}.
 
 \begin{figure}
-  \include{fig_harmonic-susceptibilities}
+  \includegraphics[width=\linewidth]{fig_harmonic-susceptibilities.png}
   \caption{Susceptibilities as a function of system size for a \twodee O(2)
     model at $T=0.7$ and with (top) fourfold symmetric and (bottom) sixfold
     symmetric perturbing fields. Different field strengths are shown in
-- 
cgit v1.2.3-54-g00ecf

